---
title: 'Gateway'
description: 'Gateway object schemas from the Fluxer API.'
---

<a id="customstatusresponse"></a>

## CustomStatusResponse

| Field | Type | Description |
|-------|------|-------------|
| emoji_animated | boolean | Whether the status emoji is animated |
| emoji_id? | ?[SnowflakeType](#snowflaketype) | The ID of the custom emoji used in the status |
| emoji_name? | ?string | The name of the emoji used in the status |
| expires_at? | ?string (date-time) | ISO8601 timestamp of when the custom status expires |
| text? | ?string | The custom status message text |

<a id="gatewaybotresponse"></a>

## GatewayBotResponse

**Related endpoints**

- [`GET /gateway/bot`](/api-reference/gateway/get-gateway-information)

| Field | Type | Description |
|-------|------|-------------|
| session_start_limit | [GatewayBotResponseSessionStartLimit](#gatewaybotresponsesessionstartlimit) | Session start rate limit information |
| shards | integer (int53) | Recommended number of shards to use when connecting |
| url | string | WebSocket URL to connect to the gateway |

<a id="gatewaybotresponsesessionstartlimit"></a>

## GatewayBotResponseSessionStartLimit

Session start rate limit information

| Field | Type | Description |
|-------|------|-------------|
| max_concurrency | integer (int53) | Maximum number of concurrent IDENTIFY requests |
| remaining | integer (int53) | Remaining number of session starts |
| reset_after | integer (int53) | Milliseconds until the limit resets |
| total | integer (int53) | Total number of session starts allowed |

